Breakouts Constraining Stress Tensors 15

Figure 11. Lower hemisphere stereographic projection plots of the azimuth of borehole elongation at 1 m log depth intervals from the hour wells drilled in the Point Pedernales field. (top) Lower hemisphere with all the well data plotted. (bottom) Enlargements of the top figure. The graduated depth scale shows the true vertical depth in meters.